<template>
  <div class="keen-slider__slide">
    <img class="" :src="thumbnail_url"/>
  </div>
</template>

<script>
import GalleryItemMixin from "~/components/gallery/GalleryItemMixin";

export default {
  name: "HorizontalGalleryItem",
  mixins: [GalleryItemMixin],
}
</script>

<style lang="css" scoped>
</style>
